From e4fb9966e762852bf17f21c8406501d42fae0b61 Mon Sep 17 00:00:00 2001
From: hc <haocheng.xie@respiree.com>
Date: Fri, 10 Apr 2026 17:39:12 +0800
Subject: Initial commit: iHealth BLE scanner app with patched SDK v1.5.0

---
 __tests__/App.test.tsx | 13 +++++++++++++
 1 file changed, 13 insertions(+)
 create mode 100644 __tests__/App.test.tsx

(limited to '__tests__/App.test.tsx')

diff --git a/__tests__/App.test.tsx b/__tests__/App.test.tsx
new file mode 100644
index 0000000..e532f70
--- /dev/null
+++ b/__tests__/App.test.tsx
@@ -0,0 +1,13 @@
+/**
+ * @format
+ */
+
+import React from 'react';
+import ReactTestRenderer from 'react-test-renderer';
+import App from '../App';
+
+test('renders correctly', async () => {
+  await ReactTestRenderer.act(() => {
+    ReactTestRenderer.create(<App />);
+  });
+});
-- 
cgit 

